\input{preamble.tex}
\graphicspath{{images/8451-8453}, {images}}

\title{8451 Thermostat / 8453 Thermostat EEM}
\author{M-Labs Limited}
\date{January 2025}
\revision{Revision 0}
\companylogo{\includegraphics[height=0.73in]{artiq_sinara.pdf}}

\begin{document}
\maketitle

\section{Features}

    \begin{itemize}
        \item{features}
    \end{itemize}

\section{Applications}

    \begin{itemize}
        \item{applications}
    \end{itemize}

\section{General Description}

% Switch to next column
\vfill\break

%\begin{figure}[h]
%    \centering
%    \scalebox{1.15}{
%    \begin{circuitikz}[european, every label/.append style={align=center}]
%        \begin{scope}[]
%            % if applicable
%        \end{scope}
%    \end{circuitikz}
%    }

%    \caption{Simplified Block Diagram}
%\end{figure}

\begin{figure}[hbt!]
    \centering
    \includegraphics[height=2in]{photo8451.jpg}
    \caption{Thermostat}
    \includegraphics[height=2in]{photo8453.jpg}
    \caption{Thermostat EEM}
    \includegraphics[angle=90, height=0.6in]{fp8453.pdf}
    \caption{Thermostat EEM front panel}%
    \label{fig:example}%
\end{figure}

% For wide tables, a single column layout is better. It can be switched
% page-by-page.
\onecolumn

\sourcesectiond{8451 Thermostat}{8453 Thermostat EEM}{https://github.com/sinara-hw/Thermostat}{https://github.com/sinara-hw/Thermostat_EEM}

\section{Specifications}

\ordersection{8451 Thermostat or 8453 Thermostat EEM}

\finalfootnote

\end{document}
