\input{preamble.tex}
\graphicspath{{images/4459}, {images}}

\title{4459 PDH Lock Generator Pounder}
\author{M-Labs Limited}
\date{January 2025}
\revision{Revision 0}
\companylogo{\includegraphics[height=0.73in]{artiq_sinara.pdf}}

\begin{document}

\maketitle

\section{Features}

    \begin{itemize}
        \item{features}
    \end{itemize}

\section{Applications}

    \begin{itemize}
        \item{applications}
    \end{itemize}

\section{General Description}

% Switch to next column
\vfill\break

%\begin{figure}[h]
%    \centering
%    \scalebox{1.15}{
%    \begin{circuitikz}[european, every label/.append style={align=center}]
%        \begin{scope}[]
%            % if applicable
%        \end{scope}
%    \end{circuitikz}
%    }

%    \caption{Simplified Block Diagram}
%\end{figure}

\begin{figure}[hbt!]
    \centering
    \includegraphics[height=2.5in]{photo4459.jpg}
    \caption{Pounder + Stabilizer cards}
    \includegraphics[height=3in, angle=90]{fp4459.pdf} 
    \caption{Pounder + Stabilizer front panel}
\end{figure}

% For wide tables, a single column layout is better. It can be switched
% page-by-page.
\onecolumn

\sourcesectiond{4459 PDH Lock Generator Pounder}{Stabilizer}{https://github.com/sinara-hw/Pounder}{https://github.com/sinara-hw/Stabilizer}

\section{Specifications}

\ordersection{4459 Pounder + Stabilizer}

\finalfootnote

\end{document}
